)^2

) (GeV/c π,Λ M( 1.3 1.32 1.34 1.36

Counts

500

1000

1500

2000

Parameter 1 = 1.32195

)^2

) (GeV/c π,Λ M( 1.3 1.32 1.34 1.36

Counts

500

1000

1500

2000 ALICE Preliminary

= 5.02 TeV NNs Pb-Pb

|y| < 0.5

Centrality 10-20% c < 1.5 GeV/ Tp <c 1 GeV/

+ Ξ+^-Ξ

Particle:

Invariant mass fit

)c )(GeV/ π,Λ M( 1.3 1.32 1.34 1.36

| > 0.9} ηΔ {SP,| Tot 2v

0.02

0.03

0.04

0.05

0.06

fit Tot 2v

ALI-PREL-147829

ALI-PREL-147829