0 50 100 chN 2−

0

2

4

6

)c (GeV/ m)_TpM(

ALICE Preliminary = 13 TeV s pp,

| < 0.8 η|

)c ranges (GeV/ Tp 1.0) − (0.15 2.0)−(1.0 3.0)−(2.0 4.0) − (3.0 5.0)−(4.0

ALI-PREL-581756

ALI-PREL-581756