)c (GeV/ Tp 0 1 2 3 4 5 6 7 8 9

H_Λ^3/H_Λ^3

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 ALICE Preliminary = 5.02 TeV NNs Pb −Pb 40% centrality −10

−π He +

3→H _Λ^3 +π + He^3→H_Λ^3

Uncertainties: stat. (bars), sys. (boxes)

ALI-PREL-146731

ALI-PREL-146731