B.R.

0.15 0.2 0.25 0.3 0.35

B.R.

×y/dNd

4−10

SHARE GSI-Heidelberg Hybrid UrQMD

2 H_Λ^3

H + Λ 3

ALICE Preliminary = 5.02 TeV NNs Pb −Pb 10% centrality −0

ALI-PREL-146719

ALI-PREL-146719