(MeV)

chem T 100 120 140 160 180 200

Ratio

7−10

6−10

5−10

4−10

3−10

2−10

1−10

ALICE Preliminary = 5.02 TeV NNs Pb −Pb 10% centrality −0

H/p Λ 3

H/d Λ 3

THERMUS σ 1± H/p Λ 3 Measured σ 1± H/d Λ 3 Measured

ALI-PREL-146727

ALI-PREL-146727