| < 0.5 lab η|〉_{lab}η / d chNd〈

200 400 600 800 1000 1200 1400 1600 1800 2000 2200

B.R.

×y/dNd

0

0.01

0.02

0.03

0.04

0.05

0.06

3−10 × ALICE Preliminary = 5.02 TeV NNs Pb −Pb

−π He +

3→H _Λ^3 +π + He^3→H_Λ^3

Uncertainties: stat. (bars), sys. (boxes) Points shifted for visibility

ALI-PREL-146703

ALI-PREL-146703