[ps]

0-t_{πexp,} t-t 0 1000 2000 3000 4000 5000

Counts

1

10

210

310

410

data fit π K p mismatch

Performance

ALICE = 5.44 TeV NNs Xe-Xe

< 1.6 GeV/c Tp 1.5 <

FIT shape EXP time differences

ALI-PERF-160792

ALI-PERF-160792