0 0.5 1 1.5 2 2.5 3

(rad) φΔ

410

Arbitrary unit (a.u.)

- p (OB) −− cΣ+p - + + cΣ (SB) p - ^{−−}_cΣ+ - p + + cΣ

ALICE Performance

| < 1 ηΔ | < 0.5, | ++ cΣy|

/c < 12 GeV ++ cΣ Tp 4 < /c < 4.5 GeV p Tp 0.4 <

= 13.6 TeV spp, 1− = 5.5 pb intL

ALI-PERF-624598

ALI-PERF-624598