)^2c

) (GeV/ π M(K 1.75 1.8 1.85 1.9 1.95 2

)^2 Entries / (4 MeV/c

0

100

200

300

400

500

600

700 c < 2 GeV/ Tp = 8 TeV, 1 < s , pp, 0D ALICE Preliminary

0.9 ± ) = 7.2 σ Significance (3 83 ± ) = 621 σ S(3 2c 0.002) GeV/ ± = (1.864 μ_2 c 0.002) GeV/ ± = (0.011 σ )^2c

) (GeV/ π M(K 1.75 1.8 1.85 1.9 1.95 2

)^2

Entries / (8 MeV/c

0

20

40

60

80

100

120

140

c < 2 GeV/ T = 8 TeV, 1 < p s , pp, 0D

c < 6 GeV/ Tp 5 < 0.7 ± ) = 11.0 σ Significance(3 21 ± ) = 239 σ S(3 2c 0.001) GeV/ ± = (1.866 μ 2c 0.001) GeV/ ± = (0.013 σ

)^2c

) (GeV/ π M(K 1.7 1.75 1.8 1.85 1.9 1.95 2 2.05 2.1

)^2

Entries / (30 MeV/c

0

10

20

30

40

50

60 c < 6 GeV/ T 5 < p

c < 24 GeV/ Tp 16 < 0.8 ± ) = 3.4 σ Significance(3 9± ) = 29 σ S(3 2c 0.007) GeV/ ± = (1.855 μ 2c 0.006) GeV/ ± = (0.020 σ

ALI-PREL-130982

ALI-PREL-130982