0.45 0.5 0.55 )^2c

(GeV/

-π^+πM

210

310

410

Counts (a.u.)

= 2.76 TeV NNs Pb −Pb 5 % −0 ALICE

) < 1.5 c (GeV/ Tp : 0.4 < 0 SK | < 0.5 η| signal peak

Background under

under signal peak

Proxy to the background

Data Background fit Signal + Background fit

ALI-PUB-530601

ALI-PUB-530601