)c (GeV/ Tp 5 10 15 20 25 30 35

Efficiency × Acceptance

3−10

2−10

1−10

1

Prompt Feed-down

ALICE Preliminary

(and charge conj.)

+π ^- K

→ ^0D

= 13 TeV s pp,

ALI-PREL-131112

ALI-PREL-131112