)c (GeV/ Tp 0 5 10 15 20 25

)c^{-1} (GeV

|<0.5

y ||_Tp/dNd

6−10

5−10

4−10

3−10

2−10

1−10 1

60-80% Pb-Pb

>_{AA}

T <×

-scaled reference s pp

Systematic uncertainties Data B feed-down

7.0% normalization uncertainty on pp reference not shown ± 1.3% BR systematic uncertainty not shown ±

ALICE Preliminary

= 5.02 TeV NNs meson +D* |<0.5 y|

ALI-PREL-134106

ALI-PREL-134106