0 5 10 15 20 25 30 35 t (cm) c

10

210

310

)^{-1} t) (cm c /d( Nd

ALICE Preliminary

= 5.02 TeV, 0-90% NNs Pb-Pb

ALI-PREL-338000

ALI-PREL-338000