(cm) vtx Z 10- 8- 6- 4- 2- 0 2 4 6 8 10

> tracklets N<

24

26

28

30

32

34

36

38

40

Corrected profile Uncorrected profile

ALICE Preliminary = 8.16 TeV NNs p-Pb,

| < 1 labη|

ALI-PREL-154260

ALI-PREL-154260