| < 1.0) labη

SPD tracklets (|

0 50 100 150 200 250

Counts ( arb. units)

7-10

6-10

5-10

4-10

3-10

2-10

1-10 1 10

Minimum bias trigger

> 8 GeV

Cluster EMC E Trigger

ALICE Preliminary = 8.16 TeV NNs p-Pb,

ALI-PREL-154152

ALI-PREL-154152