)c (GeV/ Tp 0 0.5 1 1.5 2 2.5 3

TPC-TOF Matching efficiency

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

+π^+K p

ALICE Performance = 5.44 TeV NNs Xe-Xe,

B = 0.2 T

ALI-PERF-160872

ALI-PERF-160872