β TOF

0.75 0.8 0.85 0.9 0.95 1 1.05

Signal (arb. units)

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08 ALICE Performance = 5.02 TeV NNs Pb -Pb c = 4.00 GeV/ p π K p

ALI-PERF-141747

ALI-PERF-141747