0 0.05 0.1 0.15 0.2 0.25 0.3 )c (GeV/ invQ

0.98 1 1.02

1.04

1.06

1.08 1.1 1.12

1.14

1.16

1.18

)_{inv} C(Q

ALICE Preliminary = 5.02 TeV NNs Pb − 30-50% Pb correlation

PHOS

γ - PCM γ c < 0.50 GeV/ Tk 0.35 <

Data Bkg fit HIJING

ALI-PREL-504790

ALI-PREL-504790