(cm) xy DCA 1- 0.8- 0.6- 0.4- 0.2- 0 0.2 0.4 0.6 0.8 1

Entries / (1 cm)

310

410

510

c < 1.2 GeV/ Tp≤ deuteron, 1 Total fit Secondary deuterons Primary deuterons Data

ALICE Preliminary

= 5.02 TeV (0-5%) NNs Pb-Pb

= 5.02 TeV (0-5%) NNs Pb-Pb

ALI-PREL-265629

ALI-PREL-265629