acc N 0 20 40 60 80 100

chN

0

20

40

60

80

100

)_{ch}N|_{acc}N(P

3-10

2-10

1-10

1

ALICE simulation | < 0.8 η = 5.02 TeV, | s pp, c < 10 GeV/ Tp <c 0.15 GeV/

ALI-SIMUL-145103

ALI-SIMUL-145103