0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16 0.18 0.2 (cm) xy DCA 0 1 2 3 4 5 6 7

1% fit parameter distortions / Input MC distributions combined fit , K π← ^±μ fit template of b ← ^±μ fit template of c ← ^±μ fit template of

= 13.6 TeV s pp collisions,

ALICE Simulation

c < 1 GeV/ Tp 2.5, 0.5 <

− < η 3.6 < −

ALI-SIMUL-547368

ALI-SIMUL-547368