0 1 2 3 4 5 Fit parameter distortion (%) 0 2 4 6 8 10 12 14 16 18 20

Relative deviation w.r.t. the inputs (%)

, K π← ^±μ b ← ^±μ c ← ^±μ

= 13.6 TeV s pp collisions,

ALICE Simulation

c < 4 GeV/ Tp 2.5, 2 <

− < η 3.6 < −

ALI-SIMUL-547377

ALI-SIMUL-547377