0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 )^2c

(GeV/ ππM 0 0.2 0.4 0.6 0.8 1 1.2 1.4 610 ×

)^2c Counts / (0.005 GeV/

Unlike-Sign Pairs Like-Sign Pairs

-π^+π→ (980) 0f | < 0.5 y| c < 0.3 GeV/ Tp 0 <

ALICE Preliminary

= 5.02 TeV s pp,

ALI-PREL-145139

ALI-PREL-145139