HXθ cos 1- 0.8- 0.6- 0.4- 0.2- 0 0.2 0.4 0.6 0.8 1

(rad) HX φ

0 0.5 1 1.5 2 2.5 3

0 100 200 300 400 500 600 700 3-10 ×

ALICE Simulation = 5.02 TeV NNs Pb-Pb, _- μ^+μ→ψ

Inclusive J/ < 4 y , 2.5 < c < 6 GeV/ Tp 2 <

ALI-SIMUL-148524

ALI-SIMUL-148524