)c (GeV/ Tp 0 2 4 6 8 10 12

pPb R

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 < 3.53 cmsy

= 8.16 TeV, 2.03 < NNs ALICE, p-Pb -μ^+μ→ (2S) ψ,ψ Inclusive J/

(ArXiv:1805.04381) ψJ/ (2S) (Preliminary) ψ

ALI-PREL-138215

ALI-PREL-138215