)c (GeV/ Tp 0 2 4 6 8 10 12 14 16 18 20

AA R

0.0

0.2

0.4

0.6

0.8

1.0

1.2

50% -20 0π η 40%, PLB 736 (2014) 196 -20 ±π^±K

= 2.76 TeV NNs Pb, -Pb

ALI-PUB-143617

ALI-PUB-143617