)c (GeV/ Tp 1-10

×4 1 2 3 4 5 6 7 8 910 20 30

Particle ratio

0.2

0.4

0.6

0.8

1.0 = 2.76 TeV NNs Pb, - 10% Pb

-0_0 π/η ±π/^±K PLB 736 (2014) 196

= 2.76 TeV s pp, _0 π/η EPJC 77 (2017) 339

ALI-PUB-143624

ALI-PUB-143624