)^2c

(GeV/

γγ→ηM

0.4 0.45 0.5 0.55 0.6 0.65

2c Counts per 10 MeV/

0 20 40 60 80 100 120 140 ALICE = 2.76 TeV NNs Pb, -Pb 0-10% EMCal c < 14.0 GeV/ Tp <c : 12.0 GeV/ η Raw real events Mixed event BG Signal after BG subtraction Fit

ALI-PUB-143644

ALI-PUB-143644