)^4c/^2

(GeV d 2m - ^2m 1.5 - 1- 0.5- 0 0.5 1 1.5

)^4c/^2

Entries / ( 0.08 GeV

50 100 150 200 250 300 350 400 ALICE Preliminary

= 13 TeV s deuterons, pp c < 2.6 GeV/ Tp≤ 2.2

Data Signal + background Background

ALI-PREL-132280

ALI-PREL-132280