1.5 2 2.5 3 3.5 4

)^2c

(GeV/

-e^+em

50

100

150

200

250

2c entries per 40 MeV/

ALICE Performance = 13 TeV, 0-0.1% V0M s pp data MC signal + background background (exp)

/ndf = 1.3 2χ | < 0.5 y| c < 30 GeV/ Tp 5 <

1.5 2 2.5 3 3.5 4

)^2c

(GeV/

-e^+em

0

50

100

150

200

2c entries per 40 MeV/ data, background subtr. MC signal shape

bin counting window: 2c < 3.16 GeV/

-e^+em

2.92 < 0.14 ± = 2.75 B/S

ALI-PERF-146795

ALI-PERF-146795