)^2c

(GeV/

π_S^0KM

0.6 0.7 0.8 0.9 1 1.1 1.2

)^2c

Counts / (0.01 GeV/

0

10000

20000

30000

40000

50000

60000

±π + _S^0 K

→ ^±

K*(892) c < 1.4 GeV/ Tp 1.2 < Same-event pairs Mixed-event background

ALICE Preliminary = 13 TeV s pp | < 0.5 y|

ALI-PREL-130150

ALI-PREL-130150