h_Xispectrum010

Entries 7

Mean 2.267

RMS 0.7282

)c (GeV/ Tp 0 1 2 3 4 5 6

]^{-1})c ) [(GeV/

Tpdy/(d N^2d

6−10

5−10

4−10

3−10

2−10

1−10 1 10 210 = 2.76 TeV NNs Pb-Pb,

| < 0.5 y| )^0*Ξ+^0*Ξ(21

Uncertainties: stat.(bars), syst.(boxes)

0-80% (x16) 0-10% (x1) 10-40% (x1/4) 40-80% (x1/8) Boltzmann fit EPOS v3.107

ALICE Preliminary

ALI-PREL-115787

ALI-PREL-115787