/ ndf

2χ 10.09 / 15 p0 4.7±

26.6 p1 0.001 ± 1.531 p2 0.001536 ± 0.002284 p4 2479.7 ± 6454 p5 1610.0 ± 4254 −

)^2c

(GeV/ πΞM 1.48 1.5 1.52 1.54 1.56 1.58 1.6

)^2c Counts/(6 MeV/

0.5 − 0 0.5 1 1.5 2 2.5 3 3.5 310 ×

± ± ± ± −

pt bin 4 pt bin 5

-π^+Ξ

+ ^+π^-Ξ→ ^0*Ξ+^0*Ξ

< 0.5 y,c < 3.5 GeV/ Tp 3.0 <

= 2.76 TeV (40-80%) NNs Pb-Pb,

ALICE Preliminary Mixed-event subtracted

Residual background Combined fit

ALI-PREL-115771

ALI-PREL-115771