Multiplicity Class (%)

0 20 40 60 80 100

BY

0 0.2 0.4 0.6 0.8 1 = 7 TeV s pp ALICE Preliminary

c 2 GeV/

≤ _Tp≤

0.2 π≤|φΔ 1.6, |

≤y| Δ| ±π

ALI-PREL-159120

ALI-PREL-159120