) ^2c

(GeV/ μμm 2.5 3 3.5 4 4.5

2c counts per 25 MeV/

310

410

510 = 8.16 TeV NNs p-Pb, < -2.96 cms y -4.46 <

ALICE Preliminary

ALI-PREL-137846

ALI-PREL-137846