1 1.5 2 2.5 3 3.5 4 4.5

2c entries per 40 MeV/

500

1000

1500

Same event Mixed event

ALICE Preliminary = 5.44 TeV NNs Xe − 90% Xe −0

)^2c

(GeV/

−e^+em

1 1.5 2 2.5 3 3.5 4 4.5 50− 0 50 100 150 89± Signal: 340 0.016 ± : 0.062 B/S : 4.5

B+S/S

Data Monte Carlo

ALI-PERF-148508

ALI-PERF-148508