centrality (%)

0 10 20 30 40 50 60 70 80 90 100

(GeV/c) ρ

0

50

100

150

200

250

1

10

210

310

410 = 5.02 TeV NNs ALICE Pb-Pb, > 0.15 GeV/c

T,track p ALICE Preliminary

ALI-PREL-113557

ALI-PREL-113557