charged track multiplicity

0 500 1000 1500 2000 2500 3000 3500 4000

(GeV/c) ρ

0

50

100

150

200

250

1

10

210

310

410

510 = 5.02 TeV NNs ALICE Pb-Pb, > 0.15 GeV/c

T,track p ALICE Preliminary

ALI-PREL-113553

ALI-PREL-113553