(GeV/c)

T pδ

30− 20− 10− 0 10 20 30 40 50 60

probability density

6−10

5−10

4−10

3−10

2−10

1−10 1 10 210 Random Cone =5.2σ=4.1, ^{LHS}σ=-0.5, LHS μ RC (w/o lead. jet) =5.0σ=4.0, ^{LHS}σ=-0.9, LHS μ ϕη RC randomized =4.7σ=4.0, ^{LHS}σ=-0.3, LHS μ

ALICE Pb-Pb 0-10 % = 5.02 TeV NNs R = 0.2

> 0.15 GeV/c

T,track p

ALICE Preliminary

ALI-PREL-113565

ALI-PREL-113565