chN 0 10 20 30 40 50 60 70 80

)c (GeV/

〉_Tp〈

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 = 13 TeV s ALICE Preliminary, pp, | < 0.8 η, |c

< 10 GeV/ Tp , 0.16 <

-+h^+h

0-10% spherocity class Data EPOS LHC PYTHIA8 (Monash 2013) PYTHIA6 (Perugia 2011)

ALI-PREL-130757

ALI-PREL-130757