)^2c

(GeV/ πKM - _{ππK}M

0.14 0.143 0.146 0.149 0.152 0.155

)^2c Counts / (0.7 MeV/

0

10

20

30

40

50 ALICE Preliminary

+π^0 D

→ ^{*+}D and charge conj.

= 5.02 TeV NNs 60-80% Pb-Pb,

c < 8 GeV/ Tp 7 <

2c 0.0001) GeV/ ± = (0.1454 μ 2c 0.09) MeV/ ± = (0.71 σ 10 ± ) = 70 σ S(3

ALI-PREL-132740

ALI-PREL-132740