)^2c

(GeV/ ππKM 1.7 1.75 1.8 1.85 1.9 1.95 2

)^2c Counts / (12 MeV/

0 20 40 60 80 100 120 140 160 180 200 ALICE Preliminary^+π^+π^- K→ ^+D and charge conj.

= 5.02 TeV NNs 60-80% Pb-Pb, c < 7 GeV/ Tp 6 <

2c 0.001) GeV/ ± = (1.871 μ_2 c 1) MeV/ ± = (13 σ 24 ± ) = 293 σ S(3

ALI-PREL-132744

ALI-PREL-132744