)c (GeV/ Tp 1−10

×3 1 2 3 4 5 67 10 20 30

2 /GeV) c (yd Tpd_Tp

N^2d evNπ2 1

11−10

10−10

9−10

8−10

7−10

6−10

5−10

4−10

3−10

2−10

1−10 1 10 210 = 5.02 TeV NNs NSD p-Pb,

ALICE preliminary

Norm. unc. 3.1%

ALI-PREL-147797

ALI-PREL-147797