)c (GeV/ Tp 1−10

×3 1 2 3 4 5 6 7 8 10 20 30 40

γR

0.8 0.9 1.0 1.1 1.2 1.3 1.4 1.5 1.6 et al.

Shen NLO pQCD:

PDF: CT10, FF: GRV nPDF: nCTEQ15, FF: GRV nPDF: EPPS16, FF: GRV

= 5.02 TeV NNs NSD p-Pb,

ALI-SIMUL-147733

ALI-SIMUL-147733