)c (GeV/ Tp 1 10

pA Q

0.0

0.5

1.0

1.5 ALICE preliminary

= 5.02 TeV NNs Pb-side, p-Pb,

coll N γγ→ ^0π

0-100% 0-20% 20-40% 40-60% 60-100%

ALI-PREL-307472

ALI-PREL-307472