)c (GeV/ Tp 1−10

×5 1 2 3 4 5 6 7 8910 20 30 40

0π/η

0.0

0.2

0.4

0.6

0.8

1.0

0-100%

average 0-100% Tp high _{sys} 0.031

± ^{stat}

0.015 ± 0.485

= 5.02 TeV NNs CL1 p-Pb, ALICE preliminary

0-20% 20-40% 40-60% 60-100%

ALI-PREL-307520

ALI-PREL-307520