0.2 0.4 0.6 0.8 )c (GeV/ Tk 0.5 1 1.5 2 2.5

(fm) out R

ALICE

0.2 0.4 0.6 0.8 )c (GeV/ Tk 0.5 1 1.5 2 2.5

(fm)

side R

= 5.02 TeV NNs Pb −p

0.2 0.4 0.6 0.8 )c (GeV/ Tk 0.5 1 1.5 2 2.5

(fm)

long R

−π^−π⊕^+π^+π 20% −0 40% −20 60% −40 −K^−K⊕^+K^+K 20% −0 40% −20 90% −40

ALI-PUB-619108

ALI-PUB-619108