)^2c

(GeV/ μμM 0 0.5 1 1.5 2 correlated/uncorrelated pairs

4−10

3−10

2−10

1−10 1 10 = 5.02 TeV NNs Pb-Pb c < 7 GeV/ Tp 2 < < 4 y 2.5 <

0-10% 10-20% 20-30% 30-40% 40-50% 50-60% 60-70% 70-80% 80-90%

ALICE Preliminary

ALI-PREL-121249

ALI-PREL-121249