1− 0.8− 0.6− 0.4− 0.2− 0 0.2 0.4 0.6 0.8 1 eη 4−

2−

0

2

4

6

TPC eσn

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 310 × ALICE Performance = 5.02 TeV (2018) NNs Pb-Pb _{SPD}

cluster N 5000 <

< 25 cm

pileup Z 0 <

< 400

pileup M 0 < before calibration c > 0.2 GeV/

T,ep

1− 0.8− 0.6− 0.4− 0.2− 0 0.2 0.4 0.6 0.8 1 eη 4−

2−

0

2

4

6

TPC eσn

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 310 × after calibration

ALI-PERF-327083

ALI-PERF-327083