210^310

|<0.5

η|〉η/d_{ch}Nd〈 0 1 2 3 4 5 6 7 8 3−10 ×

z,s2 P

ALICE Preliminary

= 5.36 TeV NNs , OO c > 0.5 GeV/ Tp | < 0.8, η, |Λ + Λ = 5.36 TeV NNs Pb − , Pb c > 0.5 GeV/ Tp | < 0.5, y, |Λ + Λ Uncertainties: stat. (bar), total sys. (open box)

ALI-PREL-620901

ALI-PREL-620901